                                                        April 28, 1993

Dear Sir/Madam,

Please find enclosed the CSC Benchmarks (Spring 1993) tape and
documentation. Refer chapter 4.1 in the documentation to get the tape
reading instructions. Note also that the tape contents is available from
anonymous ftp nic.funet.fi (128.214.6.100) in case of severe tape reading
problems.

All appropriate results must be presented in a written form including
explanation. Some results files may be large or are senseless to include
them as a part of written results. Therefore, we have arranged a
ftp-address (orchid.csc.fi or 128.214.46.52) for result data deposition.
The username is based on abbreviation of your company name. Both username
and password are given below:

Should you have any comments or questions, please do not hesitate to
contact Sami Saarinen (sbs@csc.fi) or Klaus Lindberg (lindberg@csc.fi).
Please refer chapter 5 in the documentation for more detailed contact
information.

Yours Sincerely,

                        Sami Saarinen